-- Add configurable default upload image resolution.
ALTER TABLE "SiteContent" ADD COLUMN "uploadImageWidth" INTEGER NOT NULL DEFAULT 1920;
ALTER TABLE "SiteContent" ADD COLUMN "uploadImageHeight" INTEGER NOT NULL DEFAULT 1080;

